Advantech Device Specific Help

Advantech DEMO I/O Device

The DEMO I/O device is a  software simulated  I/O board that allows you to demonstrate all functions that don't connect to the actual I/O hardware. The DEMO I/O device consists of three channels of Analog input and two channels (bits) of Digital I/O. Analog input Channel 0 simulates a +/- 5 volt sine wave; Channel 1   a  +/- 5 volt square wave; and Channel 2 a +/- 5 volt saw tooth wave.

Each instance of the DEMO I/O board must be set to a different base address. Set the base address in the dialog box for each I/O device.